From 3d19313a7f655bc2626990650c4de8141485eea3 Mon Sep 17 00:00:00 2001
From: Frédéric Guillot <fred@miniflux.net>
Date: Fri, 26 Jul 2019 21:13:06 -0700
Subject: Add option to disable feeds

---
 database/sql/schema_version_24.sql | 1 +
 1 file changed, 1 insertion(+)
 create mode 100644 database/sql/schema_version_24.sql

(limited to 'database/sql/schema_version_24.sql')

diff --git a/database/sql/schema_version_24.sql b/database/sql/schema_version_24.sql
new file mode 100644
index 0000000..be43450
--- /dev/null
+++ b/database/sql/schema_version_24.sql
@@ -0,0 +1 @@
+alter table feeds add column disabled boolean default 'f';
\ No newline at end of file
-- 
cgit v1.2.3

