From 200974b1c6b7651577c3dd373520f023b651021a Mon Sep 17 00:00:00 2001
From: Enrico Tassi <Enrico.Tassi@inria.fr>
Date: Tue, 14 Jun 2016 12:49:01 +0200
Subject: -async-proofs-delegation-threshold default value set to 0.03

Documentation also updated.
---
 doc/refman/AsyncProofs.tex | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'doc/refman/AsyncProofs.tex')

diff --git a/doc/refman/AsyncProofs.tex b/doc/refman/AsyncProofs.tex
index ebd11c168..7ffe25225 100644
--- a/doc/refman/AsyncProofs.tex
+++ b/doc/refman/AsyncProofs.tex
@@ -122,6 +122,9 @@ reduce the reactivity of the master process to user commands.
 To disable this feature, one can pass the \texttt{-async-proofs off} flag to
 CoqIDE.
 
+Proofs that are known to take little time to process are not delegated to a
+worker process.  The threshold can be configure with \texttt{-async-proofs-delegation-threshold}.  Default is 0.03 seconds.
+
 \section{Batch mode}
 
 When Coq is used as a batch compiler by running \texttt{coqc} or
-- 
cgit v1.2.3

