From 46895fa014adcf900087041407c5e3e83225f921 Mon Sep 17 00:00:00 2001
From: Benjamin Barenblat <bbaren@mit.edu>
Date: Sat, 14 Apr 2012 12:57:43 -0400
Subject: Bugfix: Correct inter-item spacing in enumerated lists

In the official 6.033 DP1 style guide, there is no extra line between
items in itemized lists.  I assumed that because itemized lists had no
extra line, enumerated lists shouldn't either.  Apparently, I was wrong.
Woohoo, inconsistency!

Reported-by: Alex Chernyakhovsky <achernya@mit.edu>
---
 6033dp1.dtx | 8 +++-----
 1 file changed, 3 insertions(+), 5 deletions(-)

(limited to '6033dp1.dtx')

diff --git a/6033dp1.dtx b/6033dp1.dtx
index b3f5ac5..232e711 100644
--- a/6033dp1.dtx
+++ b/6033dp1.dtx
@@ -29,7 +29,7 @@
 %<class>\NeedsTeXFormat{LaTeX2e}[1999/12/01]
 %<class>\ProvidesClass{6033dp1}
 %<*class>
-    [2012/02/25 v1.0.0 MIT 6.033 design project]
+    [2012/04/14 v1.0.1 MIT 6.033 design project]
 %</class>
 %
 %<*driver>
@@ -80,7 +80,7 @@
 %</driver>
 % \fi
 %
-% \CheckSum{330}
+% \CheckSum{322}
 % \CharacterTable
 % {Upper-case    \A\B\C\D\E\F\G\H\I\J\K\L\M\N\O\P\Q\R\S\T\U\V\W\X\Y\Z
 %  Lower-case    \a\b\c\d\e\f\g\h\i\j\k\l\m\n\o\p\q\r\s\t\u\v\w\x\y\z
@@ -802,12 +802,10 @@ more information on IEEE citation, see:
 %    \end{macrocode}
 %
 % \subsubsection{Lists}
-% Spacing within lists is severely reduced.
+% Spacing within itemized lists is severely reduced.
 %    \begin{macrocode}
   \let\Itemize\itemize
   \renewcommand{\itemize}{\Itemize\setlength{\itemsep}{-0.67em}}
-  \let\Enumerate\enumerate
-  \renewcommand{\enumerate}{\Enumerate\setlength{\itemsep}{-0.67em}}
 %    \end{macrocode}
 %
 % \subsubsection{Hyperlinks}
-- 
cgit v1.2.3

