From 46895fa014adcf900087041407c5e3e83225f921 Mon Sep 17 00:00:00 2001
From: Benjamin Barenblat <bbaren@mit.edu>
Date: Sat, 14 Apr 2012 12:57:43 -0400
Subject: Bugfix: Correct inter-item spacing in enumerated lists

In the official 6.033 DP1 style guide, there is no extra line between
items in itemized lists.  I assumed that because itemized lists had no
extra line, enumerated lists shouldn't either.  Apparently, I was wrong.
Woohoo, inconsistency!

Reported-by: Alex Chernyakhovsky <achernya@mit.edu>
---
 6033dp1.cls | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to '6033dp1.cls')

diff --git a/6033dp1.cls b/6033dp1.cls
index f1c6859..cb39191 100644
--- a/6033dp1.cls
+++ b/6033dp1.cls
@@ -29,7 +29,7 @@
 %% 
 \NeedsTeXFormat{LaTeX2e}[1999/12/01]
 \ProvidesClass{6033dp1}
-    [2012/02/25 v1.0.0 MIT 6.033 design project]
+    [2012/04/14 v1.0.1 MIT 6.033 design project]
 \newif\ifdp@titlepage
 \DeclareOption{titlepage}{\dp@titlepagetrue}
 \DeclareOption{notitlepage}{\dp@titlepagefalse}
@@ -163,8 +163,6 @@
   \setcounter{secnumdepth}{0}
   \let\Itemize\itemize
   \renewcommand{\itemize}{\Itemize\setlength{\itemsep}{-0.67em}}
-  \let\Enumerate\enumerate
-  \renewcommand{\enumerate}{\Enumerate\setlength{\itemsep}{-0.67em}}
   \RequirePackage[normalem]{ulem}
   \RequirePackage[dvipdfm]{hyperref}
   \hypersetup{colorlinks,linkcolor=black,urlcolor=blue}
-- 
cgit v1.2.3

